<template>
  <NuxtLink flex text-2xl gap-2 to="/">
    <img aria-label="Nuxtodon Logo" src="/nuxtodon.svg" width="25" height="25">
    <div>
      Nuxtodon <sup text-sm italic op50 mt-1>Prototype</sup>
    </div>
  </NuxtLink>
</template>
